ALTER TABLE `exercise_device`
    ADD COLUMN `sort` INT NULL DEFAULT '0' AFTER `image_url`,
    ADD COLUMN `place` TINYINT NULL DEFAULT '0' AFTER `sort`;

UPDATE configuration set config_value = "1.0.16", date_change=CURRENT_DATE WHERE config_key = "db_version";